
   Syntax       %IMAGINARY% {&letter&}

   Where        &letter& is a small letter.

   Purpose      Sets the imaginary unit.  If no unit is specified
                then AMP will report the unit.  The default unit is
                "i".

   %Example%

   þIMAGINARY j


